God Disproved

This is a proof that God does not exist. It is done in Predicate Calculus. It is based on the problem of Evil. Axiom 1 All is created by God.

Coloss. 1:16, Revelation 4:11, Jeremiah 10:16, Psalms 86:9 ∀x[Ω_{God}(x)] Axiom 2 All by God is good. 1.Timothy 4:4, Genesis 1:31 Ω_{God}(x) → Θ_{good}(x) Axiom 3 There is evil. Mathew 6:13, John 5:19 ∃x[¬Θ_{good}(x)] Theorem 1 God does not exist. Proof 1 ∀x[Ω_{God}(x)] ∧ [Ω_{God}(x) → Θ_{good}(x)] Axioms1&2 ⇓ Substitution ∀x[Θ_{good}(x)] ⇕ DeMorgan ¬∃x[¬Θ_{good}(x)] Which is a Contradiction of Axiom3.